  Code

  The Code of your pager is actually the address of the pager. Depending upon
  the type of pager, it may have the capability of having more than one
  address. This address is an identifying code which allows a pager to
  decide which messages being transmitted are intended for it.

  For POCSAG pagers the address is 7 digits long. Valid digits are 0 - 9.
  POCSAG also has some restrictions which concern the codes and their
  frames. 



                                                                <Page Down> 
.p
  If you violate any of the restrictions for either type of pager, the
  program will notify you of the problem. Closer inspection of the codes
  may indicate a mistyped code. If this does not seem to be the problem,
  it is important that you contact someone who is knowledgable about the
  technical aspects of code assignments. The invalid POCSAG code ranges
  are as follows:  
                   0000000 - 0000007     2007664 - 2007671
                   2045056 - 2045063     2097144 - 9999999

                                                                  <Page Up> 
