
  MEM Page Alert
  
  This option allows the user to select what type of alert will be emitted
  when the pager receives a page in the 'MEM' (Silent) mode:  

        Flash/Vib   - the LED will flash and the vibrator will be activated
        Chirp/Flash - a chirp, or beep, will sound

  This allows the user to receive messages and alerts in a discreet manner. 

