
  Alert Length

  This option specifies the alert duration.  Valid selections are 2 seconds,
  8 seconds, and 21 seconds.  The 21 second alert only pertains to audio mode.
  If the 21 second alert is selected and the pager is in silent mode, the 
  alert length will be 8 seconds.
  

