20,20,THE SCALE FUNTION PRESENTS YOU WITH A GIF VIEWER DISPLAY OF THE CURRENT IMAGE.  ACROSS$
20,30,THE TOP OF THE SCREEN IS A MENU BAR. TO ACCESS THIS MENU, MOVE THE HIGHLIGHT BOX LEFT/RIGHT$
20,40,WITH THE ARROW KEYS, OR BY MOVING THE MOUSE LEFT OR RIGHT. $
20,60,THE MENU HAS THE FOLLOWING OPTIONS:$
40,70,INCREASE HEIGHT RATIO $
40,80,DECREASE HEIGHT RATIO$
40,90,INCREASE WIDTH RATIO$
40,100,DECREASE WIDTH RATIO$
60,110,EACH OF THESE OPTION WILL PRESENT A SECOND DISPLAY TO ENTER THE NEW NUMBER OF ROWS TO $
60,120,COMBINE OR EXPAND. HITTING ESC OR ENTERING NO NUMBER WILL RESULT IN NO CHANGE$
40,130,RESET DISPLAY - RETURN DISPLAY TO CURRENT CONGIFURATION, REMOVING ALL SCALING$
40,140,SHOW INFORMATION THIS SIZE WILL SHOW THE CURRENT IMAGE SIZE IN STITCHES AND INCHES. HIT$
40,150,ANY KEY TO CONTINUE$
20,160,SAVE - SAVE THE CURRENT SCALE AND RETURN TO THE GRID$

