LIBRARY   CPUINF16
DESCRIPTION 'CPUINF16 DLL for Windows'
EXETYPE   WINDOWS
CODE      PRELOAD MOVEABLE DISCARDABLE
DATA      PRELOAD MOVEABLE SINGLE
HEAPSIZE  1024
EXPORTS   cpuspeed			@1
		  wincpuid			@2
		  wincpuidext		@3
		  wincpufeatures	@4 
		  winrdtsc			@5
		  getdllversion		@6
		  wincpuidsupport	@7
          cpurawspeed		@8
          cpunormspeed		@9
          ProcessorCount	@10
		  
;          WEP PRIVATE
; To implement your own Windows Exit Procedure add the following
; function to your application (referring to it in the .def file is
; not required.)  The extern "C" is only required if module is C++.
; extern "C" int FAR PASCAL _WEP(int)
; {
;       /* Your WEP functionality goes here */
;  return 1;
; }

SEGMENTS	_CODE
