UTIL Command L - Lines per page

This command sets the number of lines that RBBS-PC will display before
pausing.  Typically, you will set this to the number of lines on your
terminal screen.

TIPS
1.  If you set your LINES PER PAGE to 0, RBBS-PC will NEVER pause when
    displaying text.  You will still be able to manually pause the screen
    by typing control-S.  To resume, type control-Q.

