[LG5.DEF - Sysops - you customize this file.  File LGn.DEF will
 be displayed on logon to callers with security level n]

Welcome to RBBS-PC, {FN.  Your security level 5 indicates that you have
sufficient security to access this BBS.  You have {TR mins for
this session.
