
RETURN TO BBS

End your visiting to QLCD, returning you to Board. If find some bug,
we encourage you to send mail to your SysOp, or direct to our Fido,
or Internet address:

G-Box 2:381/102
ivan.drzanic@g-box.fido.hr

QLCD is Croatian Shareware. Thanks for visiting this great Board.

