; Previous User Version 4.0 Sample Configuration file.
; Commented lines begin with a ";" (semicolon).
; All parameters (variables) are keyworded.
; ----------------------------------------------------
; List of Keywords
;  Reg         The registration number for your copy of PREUSR
;  Name        Your BBS Name as you wish it to appear to your users
;  Callers     The Drive:\Path\Filename to your CALLERS file
;  OutPut      Output filename or if preceeded with "@" a list of filenames
;  Title       The title as you wish it to appear in your displays
;  CLS         The RBBS Clear-screen Smartext that you are using
;  TitleColor  The color of your title in either ANSI or Smartext
;  NameColor   The color of the names you want in your displays (style 4)
;  CityColor   The color of the City/State field (style 4)
;  DateColor   The color of the Date in the display
;  TimeColor   The color of the Time in your displays
;  BoxColor    The color the box will be in the display
;  ColorOff    ANSI or Smartext to turn color off
;  Pause       The RBBS Smartext for Page-Break
;  Blanks      The number of trailing blank lines (CR/LF) at end of display
;  Style       The display style 1 through 4
;  City        Display City and State Field? 1=YES 0=NO
;  TopLeft     Top lefthand corner of boxed displays
;  TopRight    Top righthand corner of boxed displays
;  BottomLeft  Bottom lefthand corner of boxed displays
;  BottomRight Bottom righthand corner of boxed displays
;  Horizontal  Horizontal characters for boxed display
;  Vertical    Vertical characters for boxed display
;  Plain       Border character for plain vanilla displays
;  Users       Number of users to display for style 4 output files
;-----------------------------------------------------------------------------
;
Reg=0
;
Name=The BBS-Widows RBBS
;
Callers=     C:\RBBS\CALLERS
;
;Output Filename
;       If this filename is preceeded with a "@" (at) sign then
;       this is a file containing a list of filenames for output.
OutPut=@PREUSR.LST
;
Title=Last % Callers to BBS-Widows Were
;
CLS={CS
;
TitleColor=[1;33;44m
;
NameColor=[1;37;47m
;
CityColor=[0;34;47m
;
DateColor=[1;30;47m
;
TimeColor=[0;31;47m
;
BoxColor=[0;34;47m
;
ColorOff=[0;37m
;
Pause={PB
;
Blanks=1
;
Style=4
;
;Display City/State field?
;       1=YES 0=NO
City=1
;
;
;Box styles and colors for output styles 3 and 4
; in the ascii code NOT the actual character.
;
TopLeft=214
;
TopRight=183
;
BottomLeft=211
;
BottomRight=189
;
Horizontal=196
;
Vertical=186
;
Plain=42
;
Users=10
;
;------------------------------------------------------------------------------
;Here is a useful list of ANSI color codes which can be seen with a text editor
;
; [0;1;33m  BRIGHT YELLOW             [0;1;33m[5m   BRIGHT YELLOW BLINKING
; [0;33m    AMBER                     [0;33m[5m     AMBER BLINKING
; [0;1;35m  BRIGHT MAGENTA            [0;1;35m[5m   BRIGHT MAGENTA BLINKING
; [0;35m    MAGENTA                   [0;35m[5m     MAGENTA BLINKING
; [0;1;31m  BRIGHT RED                [0;1;31m[5m   BRIGHT RED BLINKING
; [0;31m    RED                       [0;31m[5m     RED BLINKING
; [0;1;36m  BRIGHT CYAN               [0;1;36m[5m   BRIGHT CYAN BLINKING
; [0;36m    CYAN                      [0;36m[5m     CYAN BLINKING
; [0;1;32m  BRIGHT GREEN              [0;1;32m[5m   BRIGHT GREEN BLINKING
; [0;32m    GREEN                     [0;32m[5m     GREEN BLINKING
; [0;1;34m  BRIGHT BLUE               [0;1;34m[5m   BRIGHT BLUE BLINKING
; [0;34m    BLUE                      [0;34m[5m     BLUE BLINKING
; [0;1;30m  GRAY                      [0;1;30m[5m   GRAY BLINKING
; [0;1m     BRIGHT WHITE              [0;1m[5m      BRIGHT WHITE BLINKING
; [0m       WHITE                     [0m[5m        WHITE BLINKING
;
; [0m
; ANSI Codes Courtesy of Steven Greenfield of SMP Systems
