When adding a new system to PCB Freedom, certain information is needed in order to correctly handle things online. Since this system was at one time set up for use by PCB Freedom, the old information stored in the INI has been pre-loaded into the various fields of the dialog box.

Make any changes necessary to this information, and then save the new configuration. The data will be stored in the INI file, and the system will be added to PCB Freedom.

