By unchecking the box for "Graphics system ?", you have chosen to have PCB Freedom respond with a "N" when asked if you want graphics by the board.

This means that the selected board will not send ANSI graphics commands to the terminal after login.

If you wish to have the selected board send these graphics commands, simply check the box.
