You have elected to make this board a "Graphics board ?" by checking the check box for that.

This means that, when PCB Freedom logs on to this board, it will respond with a yes to the graphics question, resulting in the system sending ANSI graphic commands to the terminal.

If this is not what you wish, simply uncheck the box, and PCB Freedom will respond to the board with a N .

