You have removed the "x" which marks this system as a "Mail System". This means that, after logging on to the board, PCB Freedom will join the conference which you have preset, then stop activity, until such time as you disconnect.

If you wish to do mail runs on this system, simply check the "Mail System ?" checkbox again.

