This dialog box is used to edit the parameters stored by PCB Freedom for a board. It will allow you to edit any previously saved parameters stored in PCB Freedom's private INI file for the various systems which will be using PCB Freedom. Whenever "(None)" is the default, or the selected entry, PCB Freedom will display sample entries for each field, and all of the edit boxes will be inactive.

PCB Freedom has loaded a list of systems which have been designated to use PCB Freedom. These systems are listed in the combination box to the right. Use the down arrow on the far right to bring up the drop down box of system names. Then simply select one of the listed names. Whatever settings are stored for that system, will appear in the appropriate fields.

