
DenyFREQS:
	Name of the file, including the times,
	FDREQ shall service requests with others
	than the normal values.
	(if you want to do a smart request-servicing,
	please look onto the possibility to setup
	deny-times and request-ratios for each
	connectspeed).

example:
00:00-00:10 0
03:30-04:00 0
07:00-07:35 50
06:30-07:10 80
18:30-19:40 40
XX:XX-YY:YY ZZ

XX:XX -> start time
YY:YY -> end time
ZZ    -> percentage of the main value in FDRSETUP/values

	this means, if you allow an amount of 400kB
	in FDRSETUP/values, a request at 18:45 will
	receive max. 160kB.
	If you generally allow 20 files, this
	requester will receive max. 8 files.
	This is activ for all request-values.

	You are able to install a smart, speedmatching
	request-value-system.
	You may edit a denyfile for each possible baudrate
	(300,1200,2400,4800,9600,12000,14400,16800,19200,
	21200,24000,28800,31200,34000,57600,64000
	and 38400(DTE)).

example: FREQS with 2400 baud:

2400.DF1
	Name of the file, including the times, where
	FDREQ on task 1 shall service a request with
	2400 baud with special values.

example:
00:00-00:10 0
03:30-04:00 0
07:00-07:35 20
06:30-07:10 10
18:30-19:50 40


	If there are any times, not included in 
	a *.DFR-file, the requester will receive the
	normal rates (as in FDRSETUP).
