                                ~7D~6R ~3A~2N~4S~5I
                            ~2By:  Dan Roseen
~/
     Welcome to DR ANSI!  DR ANSI is a BBS door for viewing ANSI screens.
If the sysop has separated the ANSI screens into categories, you can select
a category of screens that you want to view.

     Select an ANSI screen by entering the number of the screen you want
displayed.  When the screen is done drawing, press Enter or Space to continue.
When you return to the list of screens, you will notice that the selection
numbers for screens you have viewed will have almost disappeared to remind
you of which screens you have already viewed.

     A 'slide-show' can be made by entering multiple screen numbers.
Screens will be displayed in the same order as they are entered.  Separate
the screen numbers by a space, comma, or semi-colon.  You can select a
range of screens to view by using the minus '-' character.  Here's an
example slide-show selection:  1 5 10 20-30 40

     You can escape out of a slide-show by pressing the ESC key.  When the
current screen has finished you will be brought back to the screen
selection menu without finishing the slide-show.

     While you are using DR ANSI, you can stop/skip or pause any selection
or ANSI screen by pressing 'S'top/skip or 'P'ause.  Keep in mind that the
BBS may be ahead of you and you will still see what has already been
displayed on the BBS's screen.  In other words, the slower your BBS
connection, the more delayed the response will be to the 'S' and 'P' keys.

~2                       I hope you enjoy ~7D~6R ~3A~2N~4S~5I~2!
