** DROP FILE NOT FOUND!
You passed the following parameter:
NOTHING
Available parameters:
-?, -H, -HELP  : Displays this command-line help.
-L, -LOCAL     : Operate in local mode with no door information [drop] file.
-ADDRESS x     : (*) Sets serial port address in hexadecimal format.
-IRQ x         : (*) Sets the serial port IRQ line.
-NOFOSSIL      : Disables use of fossil driver, even if available.
-CFG x         : Uses alternate .CFG files (use with unmapped networks).
-NODE x        : Defines node in use (Must be used with DORINFO?.DEF).
-PERSONALITY x : Sets the sysop status line personality to use.  Valid
                 parameters: STANDARD, PCBOARD, REMOTEACCESS, and WILDCAT.

(*) ONLY HAS EFFECT WHEN A FOSSIL DRIVER IS NOT BEING USED.
When not in local mode, the 1st parameter must be the dropfile path & name.
^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^^
START.BAT -LOCAL                                ; Operate in local mode
START.BAT c:\bbs\door.sys                       ; Standard com ports
START.BAT c:\bbs\chain.txt -IRQ 5 -ADDRESS 03E8 ; Non standard setting
START.BAT c:\bbs\callinfo.bbs -NOFOSSIL         ; Bypass fossil
START.BAT c:\bbs\door.sys -PERSONALITY WILDCAT  ; WildCat-style status bar
START.BAT c:\bbs\dorinfo5.def -NODE 5           ; Requiered for DORINFO?.DEF