

                             {CF{G1 SYSOP HELP {C0{G0
                             {CE------------

     {C2F1  {CBExit RBBS-PC                       {C2F2  {CBShell To DOS
     {C2F3  {CBToggle Printer Log                 {C2F4  {CBToggle Sysop Annoy
     {C2F5  {CBForce Caller On Line               {C2F6  {CBToggle Page Availability
     {C2F7  {CBSysop On Next                      {C2F8  {CBGrant Temporary Sysop
     {C2F9  {CBToggle Snoop                      {C2F10  {CBInitiate Chat
                                           {C2ESC  {CBAnswer Page/Quit Chat
 {C2ALT-F7  {CBToggle LogOff Request         {C2ALT-F10  {CBToggle ANSIChat/LineChat

    {C2END  {CBHang-Up Caller                {C2ALT-END  {CBLine Noise Simulation
                                      {C2CTRL-END  {CBLock Out Caller

     {C2UP  {CBRaise security by 1              {C2DOWN  {CBLower Security by 1
   {C2LEFT  {CBLower time by 1 minute          {C2RIGHT  {CBRaise time by 1 minute

                                  {C2CTRL-UP/DOWN  {CBRaise/Lower security by 5
                               {C2CTRL-LEFT/RIGHT  {CBLower/Raise time by 5

   {C2PGUP  {CBDisplay user's profile           {C2PGUP  {CBRemove user's profile{C0
