{CDPlease decide on a new password and enter it now.

{CEYour password must be at least {CA3 {CEcharacters long and
no more that {CA15 {CEcharacters long.

{CBOnce changed, you will expected to enter your new password
the next time you log on.

{CFRemember, Anyone who knows your password can log on as you
and read your personal mail, or to use other system privileges
that you may have.

{C9You should change your password if you have reason to believe that it
is known to other persons.

{CCAny misuse of this BBS by sharing passwords with other users will
result in BOTH parties being LOCKED OUT and their names will be
made available to the other BBS operators in the area.{C0

