##base _HaltBase
##bias 30
*
*   halt.fd --- halt library interface.
*
*   (c) Copyright 1995 SHW Wabnitz
*   Written by Bernhard Fastenrath (fasten@shw.com)
*
*   This file may be distributed under the terms
*   of the GNU General Public License.
*
Reboot(flags)(D1)
Unmount(filesystem)(D1)
AddShutdownPort(prt)(D1)
RemShutdownPort(prt)(D1)
ShutdownStatus(info)(D1)
##end
