Opening a recently used sketch file

After a sketch is opened, its path and name are added to the top of a list of recently used files placed just above the “Exit” menu item of the File menu.  In Windows, the file and path name are prefixed by a numbered accelerator which represents the order in which the files were opened.

To open a sketch file from the list, select it from the list with the mouse or type its number after activating the File menu.

To change the number of files remembered within the range 0 to 9, use the Configure... button from the Add-in Manager after selecting the “Recently Used Files” Add-in.