;******* TEMPLATE  C Sample Program Module Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.
;  Copyright 1991 IBM Corporation
;
NAME    feed 

DESCRIPTION 'Simple Feed Example'

CODE    MOVEABLE
DATA    MOVEABLE MULTIPLE

HEAPSIZE  65536
STACKSIZE 65536

IMPORTS
        MESAFEED.setRTFValue        
