; module-definition file for generic -- used by LINK.EXE

NAME	     vlibdemo	   ; application's module name

DESCRIPTION  'Sample Microsoft Windows Application'

EXETYPE      WINDOWS	   ; required for all Windows applications

STUB	     'WINSTUB.EXE' ; Generates error message if application
			   ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  		PRELOAD MOVEABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  		PRELOAD MOVEABLE MULTIPLE


HEAPSIZE	0x8FFF   ; 36k
STACKSIZE	10240	   ; recommended minimum for Windows applications

; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
	MainWndProc   @1   ; name of window processing function
