%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Setting Table Column Width and Alignment">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Fri Feb 14 00:02:16 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Setting Table Column Width and Alignment}

\subsubsection{$\blacktriangleright $\quad To set the alignment of table
columns}

\begin{enumerate}
\item  Select the column or columns you want to align.

\item  Click\FRAME{itbpF}{19.5625pt}{18.8125pt}{2pt}{}{}{property.wmf}{%
\special{language "Scientific Word";type "GRAPHIC";display "PICT";valid_file
"F";width 19.5625pt;height 18.8125pt;depth 2pt;original-width
17.8125pt;original-height 16.9375pt;cropleft "0";croptop "1";cropright
"1";cropbottom "0";filename 'property.wmf';file-properties "XNPEU";}}, or
from the Edit menu, choose Properties.

\item  Choose the Alignment tab.

\item  Set the alignment you want.

\item  Choose OK.
\end{enumerate}

\subsubsection{$\blacktriangleright $\quad To set the width of table columns}

\begin{enumerate}
\item  Select the column or columns whose width you want to set.

\item  Click\FRAME{itbpF}{19.5625pt}{18.8125pt}{2pt}{}{}{property.wmf}{%
\special{language "Scientific Word";type "GRAPHIC";display "PICT";valid_file
"F";width 19.5625pt;height 18.8125pt;depth 2pt;original-width
17.8125pt;original-height 16.9375pt;cropleft "0";croptop "1";cropright
"1";cropbottom "0";filename 'property.wmf';file-properties "XNPEU";}}, or
from the Edit menu, choose Properties.

\item  Choose the Column Width tab.

\item  Set the width:

\begin{enumerate}
\item  Check Use Automatic Width to have the table be wide enough to
accommodate the widest entry in the column.

\item  Uncheck Use Automatic Width to specify a column width, then enter a
width value and a unit of measure.
\end{enumerate}

\item  Choose OK.\medskip 
\end{enumerate}

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Adding and removing table lines}{}{}{Table_lines.tex}

\item  \hyperref{Adding table rows and columns}{}{}{Add_table_elements.tex}

\item  \hyperref{Deleting table rows and columns}{}{}{%
Delete_table_elements.tex}

\item  \hyperref{Matrix}{}{}{Matrix.tex}

\item  \hyperref{Merging and splitting table cells}{}{}{Merge_split_cells.tex%
}

\item  \hyperref{Editing the properties of a table}{}{}{%
Edit_table_properties.tex}

\item  \hyperref{Setting a table baseline}{}{}{Set_table_baseline.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Alignment}{}{}{%
index.tex#Alignment}, \hyperref{Cell}{}{}{index.tex#Cell}, \hyperref{Columns%
}{}{}{index.tex#Columns}, \hyperref{Editing text}{}{}{index.tex#Editing text}%
, \hyperref{Formatting}{}{}{index.tex#Formatting}, \hyperref{Tables}{}{}{%
index.tex#Tables}}

\end{document}
