%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Printing a Document">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 23:06:32 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Printing a Document}

You can print a document from the \hyperref{program window}{}{}{%
Program_window.tex} or the preview screen.

\subsubsection{$\blacktriangleright $\quad To print a document from the
program window}

\begin{enumerate}
\item  Save the document.

\item  Click\FRAME{itbpF}{22.4375pt}{21.0625pt}{2pt}{}{}{fileprt.wmf}{%
\special{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid_file "F";width 22.4375pt;height 21.0625pt;depth
2pt;original-width 17.8125pt;original-height 16.9375pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'fileprt.wmf';file-properties
"XNPEU";}}, or from the File menu, choose Print.

\item  Make these selections in the Print dialog box:

\begin{enumerate}
\item  Select the printer you want to use.

\item  Select the range of pages you want to print. The default is all.

\item  Select the number of copies you want to print. The default is 1.
\end{enumerate}

\item  Choose OK.
\end{enumerate}

\subsubsection{$\blacktriangleright $\quad To print a document from the
preview screen\label{preview}}

\begin{enumerate}
\item  \hyperref{Preview}{}{}{Preview.tex} the document.

\item  Choose Print.

\item  Make these selections in the Print dialog box:

\begin{enumerate}
\item  Select the printer you want to use.

\item  Select the range of pages you want to print. The default is all.

\item  Select the number of copies you want to print. The default is 1.
\end{enumerate}

\item  Choose OK.\medskip
\end{enumerate}

\subsection{$\ $Related topic}

\begin{itemize}
\item  \hyperref{Printing to a file}{}{}{Print_file.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid_file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{Index.tex} {\small \hyperref{\hyperref{File menu commands}{}{%
}{Index.tex#File menu commands}, }{}{}{index.tex#File menu commands}%
\hyperref{Previewing a document}{}{}{index.tex#Previewing a document}, 
\hyperref{Printing}{}{}{index.tex#Printing}}

\end{document}
