%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Page Size">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 22:56:51 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{\textbf{Page Size}}

The size of a printed page is determined by the style associated with the 
\hyperref{document shell}{}{}{Shell_documents.tex} and by the \hyperref{%
margins}{}{}{Margins.tex} you set.\medskip 

\subsection{\ Related topic}

\begin{itemize}
\item  \hyperref{Formatting}{}{}{Formatting.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Page setup}{}{}{Index.tex#Page
setup}, \hyperref{Page size}{}{}{Index.tex#Page size}}

\end{document}
