%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Italic Correction">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 22:20:29 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Italic Correction}

If your document contains \hyperref{italicized text}{}{}{Italics.tex}, the
program adds extra space at the end of italicized words so they do not
appear to lean into upright words. Italic correction is automatic.

You can add additional italic correction with the \hyperref{Spacing}{}{}{%
Spacing.tex} command on the \hyperref{Insert}{}{}{Insert_menu_commands.tex}
menu.\medskip

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Formatting}{}{}{Formatting.tex}

\item  \hyperref{Horizontal space}{}{}{Horizontal.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Formatting}{}{}{%
index.tex#Formatting}, \hyperref{Horizontal space}{}{}{index.tex#Horizontal
spacing}, \hyperref{Italics}{}{}{index.tex#Italics}, \hyperref{Spacing}{}{}{%
index.tex#Space}}

\end{document}
