%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="23">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Reference/Physics/Pascal">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 19:53:56 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Pascal}

\begin{tabular}{l}
Symbol: $\unit{Pa}$ \\ 
The \hyperref{SI unit}{}{}{SIUnits.tex} of pressure
\end{tabular}

A pascal is defined as the pressure that results from a force of one newton
acting uniformly over an area of one square meter.

\end{document}
