%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Tooltips">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 20:25:43 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Tooltips}

Tooltips identify the buttons on the toolbars in the program window. You can
turn off the option to display tooltips.

\subsubsection{$\blacktriangleright $\quad To display a tooltip}

\begin{itemize}
\item  Hold the mouse pointer on a toolbar button for several seconds until
the tooltip appears.
\end{itemize}

\subsubsection{$\blacktriangleright $\quad To hide the display of tooltips}

\begin{enumerate}
\item  From the View menu, choose Toolbars.

\item  Uncheck Show ToolTips.

\item  Choose OK.\medskip 
\end{enumerate}

\subsection{$\ $Related topic}

\begin{itemize}
\item  \hyperref{Customizing the program}{}{}{Customizing.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Program window}{}{}{%
index.tex#Program window}, \hyperref{Tooltips}{}{}{index.tex#Tooltips}, 
\hyperref{Window}{}{}{index.tex#Window}}

\end{document}
