%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Tabs">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Fri Feb 14 04:26:11 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Tabs}

The location of the insertion point determines the effect of the Tab key:

\begin{tabular}{ll}
\textbf{Location} & \textbf{Effect} \\ 
Matrix or table & Moves the insertion point to the next cell \\ 
Dialog box & Moves the attention to the next command \\ 
Text & Inserts horizontal space according to default
\end{tabular}

By default, when you press Tab while the insertion point is in text, you
enter a 2-em horizontal space. You can change the default so that you enter
a horizontal space of the width you specify. You set the defaults for the
Tab key from the \hyperref{Edit tab sheet}{}{}{Edit_defaults.tex} in the 
\hyperref{User Setup}{}{}{User_setup.tex} dialog box.\medskip

\subsubsection{\noindent $\blacktriangleright $\quad \textbf{To change the
Tab default}}

\begin{enumerate}
\item  From the Tools menu, choose User Setup.

\item  Choose the Edit tab.

\item  In the Spacing Defaults area, choose Tabs.

\item  In the Tabs dialog box, check the buttons next to \textbf{Enter
additional space} and \textbf{Use selected action as default}.

\item  Choose OK.

\item  In the \hyperref{Horizontal Space}{}{}{Horizontal.tex} dialog box,
select the space you want to insert.

\item  Choose OK.\medskip 
\end{enumerate}

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Customizing the program defaults}{}{}{Custom_defaults.tex}

\item  \hyperref{Formatting}{}{}{Formatting.tex}

\item  \hyperref{User setup}{}{}{User_setup.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid_file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEUR";}}}{}{}{index.tex}{\small \hyperref{Formatting}{}{}{%
index.tex#Formatting}, \hyperref{Indentation}{}{}{index.tex#Indentation}, 
\hyperref{Moving the insertion point}{}{}{index.tex#Moving the insertion
point}, \hyperref{Space}{}{}{Index.tex#Space}, \hyperref{Tabs}{}{}{%
index.tex#Tabs}}

\end{document}
