%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Stop Operation">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Fri Feb 14 00:14:41 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}
%TCIDATA{PageSetup=72,72,72,72,0}
%TCIDATA{AllPages=
%F=36,\PARA{038<p type="texpara" tag="Body Text" >\hfill \thepage}
%}


\input{tcilatex}
\begin{document}


\section{Stop Operation}

Two operations---linking to the \hyperref{Internet}{}{}{Internet.tex} and 
\hyperref{performing computations}{}{}{Compute_toolbar.tex}---can
occasionally take a long time. You can stop operations in progress with the
Stop button.

\subsubsection{$\blacktriangleright $\quad To cancel an Internet link or
halt a computation}

\begin{itemize}
\item  Click\FRAME{itbpF}{22.4375pt}{21.0625pt}{2pt}{}{}{abort.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";display "PICT";valid_file
"F";width 22.4375pt;height 21.0625pt;depth 2pt;original-width
20.3125pt;original-height 18.8125pt;cropleft "0";croptop "1";cropright
"1";cropbottom "0";filename 'abort.wmf';file-properties "XNPEU";}} or press
Ctrl+Break.\medskip 
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Stop operation}{}{}{%
Index.tex#Stop operation}}

\end{document}
