%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Status Bar">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Fri Feb 14 00:14:19 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{\textbf{Status Bar}}

The Status bar at the bottom of the program window displays messages
concerning the current command or operation, such as opening, saving or
printing your document. You can toggle on and off the display of the Status
bar from the View menu.\medskip

\subsubsection{$\blacktriangleright $\quad \textbf{To }display or hide the
Status bar}

\begin{itemize}
\item  From the View menu, choose Status bar.\medskip 
\end{itemize}

\subsection{\ Related topic}

\begin{itemize}
\item  \hyperref{Program window}{}{}{Program_window.tex}

\item  \hyperref{Toolbars}{}{}{Toolbars.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Program window}{}{}{%
Index.tex#Program window}, \hyperref{Status bar}{}{}{Index.tex#Status bar}, 
\hyperref{View menu commands}{}{}{Index.tex#View menu commands}}

\end{document}
