%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Size">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Fri Feb 14 00:03:50 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Size}

\hyperref{Limits}{}{}{Limit.tex} and \hyperref{fraction}{}{}{Fractions.tex}
numerators and denominators are set in a small-size font for \hyperref{%
in-line mathematics}{}{}{Inline_math.tex} and in a full-size font for 
\hyperref{displayed mathematics}{}{}{Displayed_math.tex}. The program sets 
\hyperref{operators}{}{}{Operators.tex} smaller for in-line mathematics and
larger for displayed mathematics

You can override the size default when you enter or edit operators and
fractions by changing Size to Big or Small. We recommend the default size
setting, \hyperref{Auto}{}{}{Auto.tex}, whenever possible.

\subsubsection{$\blacktriangleright $\quad To change the size of operators
and limits}

\begin{enumerate}
\item  Double-click the operator, or place the insertion point to the right
of the operator.

\item  Click\FRAME{itbpF}{0.2741in}{0.262in}{0in}{}{}{property.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";display "PICT";valid_file
"F";width 0.2741in;height 0.262in;depth 0in;original-width
17.8125pt;original-height 16.9375pt;cropleft "0";croptop "1";cropright
"1";cropbottom "0";filename 'property.wmf';file-properties "XNPEU";}}, or
from the Edit menu, choose Properties.

\item  Choose the size you want from the Properties dialog box for the
operator.

\item  Choose OK.
\end{enumerate}

\subsubsection{$\blacktriangleright $\quad To change the size of fraction
numerators and denominators}

\begin{enumerate}
\item  Double-click the fraction bar or place the insertion point to the
right of the fraction.

\item  Click\FRAME{itbpF}{0.2741in}{0.262in}{0in}{}{}{property.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";display "PICT";valid_file
"F";width 0.2741in;height 0.262in;depth 0in;original-width
17.8125pt;original-height 16.9375pt;cropleft "0";croptop "1";cropright
"1";cropbottom "0";filename 'property.wmf';file-properties "XNPEU";}}, or
from the Edit menu, choose Properties.

\item  Choose the size you want from the Fraction Properties dialog box.

\item  Choose OK.\medskip 
\end{enumerate}

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Formatting mathematics}{}{}{Formatting_math.tex}

\item  \hyperref{Limit position}{}{}{Limit_position.tex}

\item  \hyperref{Math defaults}{}{}{Math_defaults.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Auto}{}{}{index.tex#Auto}, 
\hyperref{Default settings}{}{}{index.tex#Default settings}, \hyperref{%
Displayed mathematics}{}{}{index.tex#Displayed mathematics}, \hyperref{%
Editing mathematics}{}{}{index.tex#Editing mathematics}, \hyperref{Entering
mathematics}{}{}{index.tex#Entering mathematics}, \hyperref{Fractions}{}{}{%
index.tex#Fraction}, \hyperref{In-line mathematics}{}{}{index.tex#In-line
mathematics}, \hyperref{Operators}{}{}{index.tex#Operators}, \hyperref{Size}{%
}{}{index.tex#Size}}

\end{document}
