%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Opening a Quick-Load Document">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 22:53:50 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Opening a Quick-Load Document}

Documents saved for Quick Load are opened more quickly than ordinary
documents. The paragraph numbers don't appear on the Status bar while the
file is being opened. Although Quick Load documents are usually two to three
times bigger than ordinary documents, they save time when you open very
large documents.\medskip 

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Saving a Quick-Load document}{}{}{Save_quick.tex}

\item  \hyperref{Opening an existing document}{}{}{%
Opening_existing_documents.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Opening a document}{}{}{%
index.tex#Opening a document}, \hyperref{Opening a Quick Load document}{}{}{%
index.tex#Opening a Quick Load document}, \hyperref{Quick Load documents}{}{%
}{index.tex#Quick Load documents}}

\end{document}
