%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Limit Position">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 22:28:15 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Limit Position}

By default, limits in \hyperref{in-line mathematics}{}{}{Inline_math.tex}
are set to the right of the operator or function, and limits in \hyperref{%
displayed mathematics}{}{}{Displayed_math.tex} are set above and below.
Limits for integral operators are an exception; they are always set to the
right.

You can override the default when you enter or edit the \hyperref{properties%
}{}{}{Properties.tex} of an \hyperref{operator}{}{}{Operators.tex} or 
\hyperref{function}{}{}{Math_names.tex} by changing the Limit Position to
Above/Below or At Right. We recommend the \hyperref{Auto}{}{}{Auto.tex}
default setting whenever possible.

\subsubsection{$\blacktriangleright $\quad To change the position of limits}

\begin{enumerate}
\item  Place the insertion point to the right of the operator or function.

\item  Click\FRAME{itbpF}{22.4375pt}{21.0625pt}{2pt}{}{}{property.wmf}{%
\special{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid_file "F";width 22.4375pt;height 21.0625pt;depth
2pt;original-width 17.8125pt;original-height 16.9375pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'property.wmf';file-properties
"XNPEU";}}, or from the Edit menu, choose Properties.

\item  Choose the limit position you want.

\item  Choose OK.\medskip 
\end{enumerate}

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Default settings}{}{}{Defaults.tex}

\item  \hyperref{Size}{}{}{Size.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Default settings}{}{}{%
index.tex#Default settings}, \hyperref{Displayed mathematics}{}{}{%
index.tex#Displayed mathematics}, \hyperref{Editing mathematics}{}{}{%
index.tex#Editing mathematics}, \hyperref{Entering mathematics}{}{}{%
index.tex#Entering mathematics}, \hyperref{Function}{}{}{index.tex#Function}%
, \hyperref{In-line mathematics}{}{}{index.tex#In-line mathematics}, 
\hyperref{Limits}{}{}{index.tex#Limits}}

\end{document}
