%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Sun Nov 03 16:01:03 1996}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{In-line Placement}

In-line frames holding graphics are placed in a line of text just like a
word. The text opens to accommodate the frame if it is higher or deeper than
the text.

\subsubsection{$\blacktriangleright $\quad To choose in-line placement}

\begin{enumerate}
\item  Select the frame. Eight black handles appear around the frame.

\item  Click\FRAME{itbpF}{22.4375pt}{21.0625pt}{2pt}{}{}{property.wmf}{%
\special{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 22.4375pt;height 21.0625pt;depth
2pt;original-width 17.8125pt;original-height 16.9375pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename
'property.wmf';file-properties "XNPEU";}},
or from the Edit menu, choose Properties.

\item  Choose the Frame tab.

\item  Choose In Line Placement

\item  Choose OK.
\end{enumerate}

An offset determines the placement of an in-line frame with relation to the
text baseline. When the offset is 0, the bottom of the frame is aligned with
the text baseline. To move the frame up or down, you set the offset of the
baseline from the bottom of the frame.

\subsubsection{$\blacktriangleright $\quad To change the offset}

\begin{enumerate}
\item  Select the frame.

\item  Click\FRAME{itbpF}{22.4375pt}{21.0625pt}{2pt}{}{}{property.wmf}{%
\special{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 22.4375pt;height 21.0625pt;depth
2pt;original-width 17.8125pt;original-height 16.9375pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename
'property.wmf';file-properties "XNPEU";}},
or from the Edit menu, choose Properties.

\item  Choose the Frame tab.

\item  Set the offset from the bottom of the frame.

\item  Choose OK.
\end{enumerate}

The program displays in-line frames according to the settings you make with
the \hyperref{User Setup}{}{}{User_setup.tex} command or when you edit the
properties of the graphic.\medskip 

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Displayed placement}{}{}{Displayed_placement.tex}

\item  \hyperref{Draft printing of graphics}{}{}{Draft_print.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename
'index.wmf';file-properties "XNPEU";}}}{}{}{index.tex}%
{\small \hyperref{Frames}{}{}{index.tex#Frames},\ \hyperref{%
Graphics}{}{}{index.tex#Graphics}, \hyperref{In-line placement}{}{}{%
index.tex#In-line placement}, \hyperref{Placement}{}{}{index.tex#Placement}}

\end{document}
