%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="23">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Font Mapping">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Fri Feb 14 03:29:24 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}
%TCIDATA{PageSetup=72,72,72,72,0}
%TCIDATA{AllPages=
%F=36,\PARA{038<p type="texpara" tag="Body Text" >\hfill \thepage}
%}


\input{tcilatex}
\begin{document}


\section{Font Mapping}

Four choices on the Font Mapping page control how Scientific Notebook
displays characters that are not in the standard ASCII range:

\begin{itemize}
\item  Use Symbol Font Mapping

\item  Use Custom Font Mapping

\item  Use Accent Font Mapping

\item  Use Universal Font Mapping
\end{itemize}

\subsection{ Why Are These Options Provided?}

Scientific Notebook stores characters using their Unicode values. Unicode is
the new international universal character set that contains over 64,000
characters. The Universal font that is supplied with Scientific Notebook,
tciuni, is a Unicode font that contains the mathematical and other special
symbols used by the program. Windows NT and Windows 95 are designed to
display Unicode characters. Unfortunately, many of the screen and printer
drivers supplied with the Windows 95 operating system are not capable of
displaying characters with Unicode numbers greater than 255.

To circumvent the problems with some of the Windows 95 screen and printer
drivers, the Universal font was split into four separate fonts, each of
whose characters are in the range 32--255. These fonts are also installed
when Scientific Notebook is installed. The division of the Universal font
into four fonts is necessarily arbitrary, so the term `custom font' is used
to denote the collection of four fonts.

When Scientific Notebook is installed, the settings in the Font Mapping
dialog box are set to the most conservative values. With these settings,
some of the extended Latin characters may not display or print correctly on
your system. Provided your computer has correctly functioning screen and
printer drivers, you can fix these problems by installing Microsoft's
multilingual support and then choosing different settings in the Font
Mapping dialog box.

\subsection{ How Do The Options Take Effect?}

The choices take effect from top to bottom. For example, some Greek
characters are available in the Symbol font and all Greek characters are in
the Custom font. If you choose both of these options, all of the Greek
characters in the Symbol font will be used, and the remaining Greek
characters will be displayed using the Custom font. If you choose the Custom
Font Mapping and the Universal Font Mapping, the Custom Font Mapping takes
precedence.

\subsection{ Symbol Font Mapping}

Check this box to use characters from the Windows Symbol font. These
characters will be used in place of the same characters from the Custom font
or the Universal font. Use this option if you like the appearance of the
characters in the Windows Symbol font better than the appearance of the same
characters from the Custom or Universal fonts.

\subsection{ Custom Font Mapping}

Check this box to use characters from the Custom font in place of the same
characters in the Universal font. Use this option if your screen or printer
driver cannot display Unicode characters with numbers above 255.

To test your drivers, you should first install the Windows 95 Multilingual
support, then uncheck the Custom Font mapping box and check the Universal
Font mapping box. Characters will be missing on the screen or in print if
your device drivers are faulty.

\subsection{ Accent Font Mapping}

Wherever possible, Scientific Notebook uses combination characters to
display accents. For example, the character \"{u} is available as a single
combination character. In many cases, combination characters do not exist,
so Scientific Notebook must accent these characters by displaying a separate
accent character in the appropriate position. When the Use Accent Font
Mapping box is checked, these separate accent characters are taken from the
custom font. This is because some Windows fonts do not contain these
accents, and in particular, the fonts supplied with Japanese Windows 95 are
lacking the accents. If you are not using Japanese Windows 95, you will
obtain better looking accents (the accents will match the character style
better) if you uncheck this box.

\subsection{ Universal Font Mapping}

Check this box, and uncheck all of the other boxes, to use the Universal
(Unicode) font. You should also install the Windows 95 Multilingual support
if you're using Windows 95. This setting provides the most general character
support, but is dependent on your having correctly functioning screen and
printer drivers.

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Edit defaults}{}{}{Edit_defaults.tex}

\item  \hyperref{Files defaults}{}{}{File_defaults.tex}

\item  \hyperref{General defaults}{}{}{General_defaults.tex}

\item  \hyperref{Graphics defaults}{}{}{Graphics_defaults.tex}

\item  \hyperref{Mathematics defaults}{}{}{Math_defaults.tex}

\item  \hyperref{Start-up document defaults}{}{}{Startup_defaults.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\FRAME{itbpF}{39.1875pt}{24.625pt}{6pt}{}{}{index.wmf}{\special{language
"Scientific Word";type "GRAPHIC";maintain-aspect-ratio TRUE;display
"PICT";valid_file "F";width 39.1875pt;height 24.625pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"0.9977";cropright "1.0027";cropbottom "0";filename
'index.wmf';file-properties "XNPEU";}}{\small \hyperref{Customizing}{}{}{%
Index.tex#Customizing}, \hyperref{Default settings}{}{}{Index.tex#Default
settings}, \hyperref{Font mapping}{}{}{Index.tex#Fonts}, \hyperref{Unicode
characters}{}{}{Index.tex#Unicode characters}, \hyperref{User setup}{}{}{%
Index.tex#User setup}}

\vspace{1pt}

\end{document}
