%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Leaving the Program">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 20:58:08 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Leaving the Program}

\subsubsection{$\blacktriangleright $\quad To leave the program}

\begin{enumerate}
\item  From the File menu, choose Exit.

or

In the program window, double-click the Control box, or from the control
box, choose Close.

\item  If you haven't saved your most recent changes, the program displays a
warning.

\begin{itemize}
\item  Choose Yes to save the changes.

\item  Choose No to discard the changes.
\end{itemize}

\item  If you're working on a new, unnamed document, the program displays a
warning.

\begin{itemize}
\item  Choose Yes to save the document

\item  Choose No to discard the document.\medskip 
\end{itemize}
\end{enumerate}

\subsection{$\ $Related topics}

\begin{itemize}
\item  \hyperref{Closing a document}{}{}{Close_document.tex}

\item  \hyperref{Opening a document}{}{}{Opening_existing_documents.tex}

\item  \hyperref{Starting the program}{}{}{Start_program.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Closing a document}{}{}{%
index.tex#Closing a document}, \hyperref{Exiting the program}{}{}{%
index.tex#Exiting the program}, \hyperref{Leaving the program}{}{}{%
index.tex#Leaving the program}, \hyperref{Saving a document}{}{}{%
index.tex#Saving a document}}

\end{document}
