%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Entry Area">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 16:44:45 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Entry Area}

The entry area is the largest part of a document window and where you type
your document. The blinking vertical bar is the \hyperref{insertion point}{}{%
}{Glossary.tex#insertion point}.

The program inserts your mathematics or text at the insertion point,
displaying the information according to the \hyperref{default settings}{}{}{%
Defaults.tex} and the \hyperref{Tag Appearance}{}{}{Tag_appearance.tex}
settings for your document$.$\medskip

\subsection{$\ $Related topic}

\begin{itemize}
\item  \hyperref{Document window}{}{}{Document_window.tex}
\end{itemize}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid_file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Creating a document}{}{}{%
index.tex#Creating a document}, \hyperref{Document windows,}{}{}{%
index.tex#Document windows} \hyperref{Entry area}{}{}{index.tex#Entry area}, 
\hyperref{Insertion point}{}{}{index.tex#Insertion point}, \hyperref{Window}{%
}{}{index.tex#Window}}

\end{document}
