%% This document created by Scientific Notebook (R) Version 3.0


\documentclass[12pt,thmsa]{article}
\usepackage{amssymb}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\usepackage{sw20jart}

%TCIDATA{TCIstyle=article/art4.lat,jart,sw20jart}

%TCIDATA{<META NAME="ViewSettings" CONTENT="31">}
%TCIDATA{<META NAME="GraphicsSave" CONTENT="32">}
%TCIDATA{<META NAME="Title" CONTENT="Customizing a Numbered or Bulleted Lead-in">}
%TCIDATA{Created=Mon Aug 19 14:52:24 1996}
%TCIDATA{LastRevised=Thu Feb 13 20:31:31 1997}
%TCIDATA{Language=American English}
%TCIDATA{CSTFile=Help.cst}

\input{tcilatex}
\begin{document}


\section{Customizing a Numbered or Bulleted Lead-in}

You can customize the lead-in of a \hyperref{numbered list}{}{}{%
Numbered_lists.tex} or \hyperref{bulleted list}{}{}{Bulleted_lists.tex}.
Regardless of the size of the lead-in, the text still aligns at the left.

\subsubsection{$\blacktriangleright $\quad To customize a numbered or
bulleted list item}

\begin{enumerate}
\item  Double-click the lead-in.

or

Select the lead-in and choose \hyperref{Properties}{}{}{Properties.tex}.

\item  In the Level box, set the level of the lead-in you want to customize.

\item  Choose Custom.

\item  Enter the lead-in.

\item  Choose OK.
\end{enumerate}

\rule{0.67in}{0.01in}

\hyperref{\FRAME{itbpF}{38.875pt}{24.5pt}{6pt}{}{}{index.wmf}{\special%
{language "Scientific Word";type "GRAPHIC";maintain-aspect-ratio
TRUE;display "PICT";valid-file "F";width 38.875pt;height 24.5pt;depth
6pt;original-width 36.875pt;original-height 22.5625pt;cropleft "0";croptop
"1";cropright "1";cropbottom "0";filename 'index.wmf';file-properties
"XNPEU";}}}{}{}{index.tex}{\small \hyperref{Bulleted lists}{}{}{%
index.tex#Bulleted lists}, \hyperref{Customizing}{}{}{index.tex#Customizing}%
, \hyperref{Lead-in}{}{}{index.tex#Leadin}, \hyperref{Lists}{}{}{%
index.tex#Lists}, \hyperref{Numbered lists}{}{}{index.tex#Numbered lists}}

\end{document}
