Copyright: Copyright (c)1996 Keith Bingham


AlienDetector

Copyright ©1996 Keith Bingham

AlienDetector will scan the immediate surroundings for Extra Terrestrial life forms using the most sophisticated techniques  available.  Its accuracy is rated at 99.9% with a 100% margin for error.

AlienDetector will AutoScan every five minutes. You can turn this feature off by removing the check mark next to AutoScan in the System Menu. (Click on the little Alien head in the upper left corner to get to the System Menu.)

I would like to thank Denise Cohen for providing the Voice of  AlienDetector.

Send your questions, comments and insults to:

kbingham@magiccarpet.com

AlienDetector is Freeware.  Give it away to your closest friends and tell them you think that your sister is an Alien.