;******* CLIPBRD   C Sample Program Module Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.
;  Copyright 1991 IBM Corporation
;
;  Different STACKSIZE used.  ( 8192 bytes )


NAME    clipbrd  WINDOWAPI

DESCRIPTION 'Clipboard Sample'

DATA    MULTIPLE

STACKSIZE 8192
HEAPSIZE  4096

PROTMODE

