LIBRARY     ISMPROCS
DESCRIPTION 'Pen for OS/2 (c) Copyright IBM Corp. 1992, 1993. All rights reserved'
DATA        MULTIPLE NONSHARED LOADONCALL
CODE        LOADONCALL

PROTMODE

EXPORTS     tdn_default_delay
            tdn_immediate
            tdn_infinite
            tdn_ink_stroke
            tdn_no_ink_stroke
            tdn_leave_ink
            tdn_hifreq_mousemove
            tdn_sensor_move
            ink_without_stroke_buffer
            ink_with_stroke_buffer
            default_inking
            lo_default
            lo_stroke_processed
            lo_emulate_mouse
            stk_default
            stk_stroke_processed
            wm_sensor_move
            tap_tp_default
            tap_tp_tap_processed
            dbl_tap_tp_default
            dbl_tap_tp_tap_processed
            pto_default
            pto_continue
            wm_exit_proximity
            wm_wrt_dev_caps_change
            wm_wrt_sysvaluechanged
            inkediting
