; GIK/2 1.0.1 EWYEA.DEF 5621-432 (C) COPYRIGHT IBM CORP 1991, 1993.  ALL RIGHTS RESERVED.  LICENSED MATERIALS - PROPERTY OF IBM.
;/**********************************************************************/
;/*                                                                    */
;/*                         MODULE PROLOGUE                            */
;/*                                                                    */
;/* COMPONENT NAME:   Data Flow Diagram (DFD) Example                  */
;/*                                                                    */
;/* MODULE NAME:      EWYEA.DEF                                        */
;/*                                                                    */
;/* DESCRIPTIVE NAME: Definition file                                  */
;/*                                                                    */
;/* COPYRIGHT:        (C) 1991, 1993 IBM Corporation                   */
;/*                                                                    */
;/* DISCLAIMER OF WARRANTIES.  The following [enclosed] code is        */
;/* sample code created by IBM Corporation. This sample code is not    */
;/* part of any standard or IBM product and is provided to you solely  */
;/* for the purpose of assisting you in the development of your        */
;/* applications.  The code is provided "AS IS", without               */
;/* warranty of any kind.  IBM shall not be liable for any damages     */
;/* arising out of your use of the sample code, even if they have been */
;/* advised of the possibility of such damages.                        */
;/**********************************************************************/

LIBRARY EWYEA INITINSTANCE

DESCRIPTION 'GIK/2 1.0.1 EWYEA.DLL 5621-432 (C) COPYRIGHT IBM CORP 1991, 1993.  ALL RIGHTS RESERVED.  LICENSED MATERIALS - PROPERTY OF IBM.'

DATA MULTIPLE NONSHARED

PROTMODE

EXPORTS
   ActionHandler
   EvDoubleClick
   EvInit
   EvMenu
   EvNew
   EvExitEnd
