; DEVINFO.DEF
; This DEF file is used to create DEVINFO.DLL, which is a sample
; program that shows how to create REXX subcommand handlers and
; use the REXX variable pool.

; The INITINSTANCE option forces the run-time set up to be done for
; each process this DLL is used in.  This means that the DLL may be
; loaded multiple times, and each will work.
LIBRARY DEVINFO INITINSTANCE

DESCRIPTION '@ Copyright IBM Corp. 1991 All Rights Reserved Licensed Materials-Property Of IBM.'
PROTMODE
DATA MULTIPLE NONSHARED LOADONCALL

; Note that the exact case of the exported routine name given here
; must match the case of the function as written in the source
; program.
EXPORTS
       DevInfo
