##base _CyberGLBase
##bias 30
##private
openGLWindowTagList(width,height,taglist)(D0,D1,A0)
closeGLWindow(glwnd)(A0)
attachGLWindowTagList(window,width,height,taglist)(A0,D0,D1,A1)
disposeGLWindow(glwnd)(A0)
resizeGLWindow(glwnd,width,height)(A0,D0,D1)
getWindow(glwnd)(A0)
allocColor(glwnd,redval,greenval,blueval)(a0,d0,d1,d2)
allocColorRange(glwnd,r1,g1,b1,r2,g2,b2)(a0,d0,d1,d2,d3,d4,d5,d6)
attachGLWndToRPTagList(screen,rp,width,height,taglist)(a0,a1,d0,d1,a2)
*
* Since some of the gl....() calls use real fpu registers as parameters
* we stop here defining cybergl library functions in the fd file since
* fd only supports cpu registers. We provide a pragma file for SAS/C
* since SAS/C supports fpu registers in pragma files. GNU C or other
* compilers probably need special stub libraries, we can't provide yet.
*
