; MaxWizard.def : Declares the module parameters for the DLL.

LIBRARY      "AppointmentWiz"
DESCRIPTION  'AppointmentWiz Windows Dynamic Link Library'

EXPORTS
    StartWizard
	GetWizardTitle	
	GetWizardDescription
	GetWizardAVI
	GetWizardBMP
