"RECORD DISPLAY/UPDATE HELP"

"The record display/update screen works just like the browse screen but"
"you are viewing the datas contained in a record instead of the records"
"contained in the current group.   You navigate in the same manner with"
"the up/down arrow keys,  the pageup/down keys,   the home/end keys and"
"the return key.   When you press return you move into the data display"
"instead of accessing the record."

"The dialog box is busy listing the functions and options available  at"
"the present time.  If you are editing an alpha segment you can use the"
"right/left arrow keys, the home/end keys,  the insert/delete and back-"
"space keys; your normal P.C. editing keys.  Pressing escape will blank"
"the display and have the effect of emptying the field."

"If you access  numeric fields you may use the calculation functions to"
"add, subtract, multiply or divide the current value.   You may perform"
"any number of these functions; you get everything except a tape."

"The display screen can also be used to view  on-screen  reports.   The" 
"right and left arrow keys are  HOT  when you are viewing the  records."
"They immediately read and display the previous or subsequent record in"
"the group.   The  arrow  keys won't work if you  have accessed a field"
"by pressing the return key, have used create or are entering a record."

"To set up an on-screen report, first record a  MACRO  to establish the"
"data you wish to see and install the proper I/O group for viewing  the"
"data. When your MACRO ends move to the first of the file, press return"
"then press the right arrow key until the speaker beeps."

"To exit the record display and return to browse you may use WRITE QUIT"
"or CREATE.   The functions in this screen are fewer so the F-keys were"
"not used.   To access a  function on this  screen you  press the first"
"letter of the description; to get QUIT press Q."

"All functions have their own help screens.  To get help for a function"
"press its' letter, then the  H  key."
