"DATA MOVEMENT HELP"

"The  data moves  display  screen  works just like the  BROWSE screen in"
"the BASE program;  you navigate in the same manner with the  up  arrow,"
"page-up, home, down arrow, page-down  and  end keys.   Pressing  return"
"tells  the  program  you  want to edit the data  move  whose  number is"
"flashing on the screen."

"The  moves  browse function  provides graphic display of the moves  now"
"active and  the  ability to edit  the  moves until  the  desired source"
"fields are aligned with the desired target fields."

"Pressing ESC from the pairing browse screen displays the  functions and"
"their associated keys.  Each function has it's own help screen(s).   To"
"see them press the key, then the H key."

"When you have your source segments, target fields and move options like"
"you want them press F9 to execute the  inter-base  update.   Errors (if"
"any) will be listed to the printer as they are encountered."

"If you decide not to execute the update  press F10 to exit  POWER COPY."