{SSI}	:	{SYNCHRONOUS SERIAL INTERFACE}
{CRA}	:	{SSI CONTROL REGISTER A}
	{PM0}-{PM7}	:	{Prescale Modulus Select}
	{DC0}-{DC4}	:	{Frame Rate Divider Control}
	{WL0}-{WL1}	:	{Word Length Control}
	{PSR}	:	{Prescaler Range}
{CRB}	:	{SSI CONTROL REGISTER B}
	{OF0}-{OF1}	:	{Serial Output Flag}
	{SCD0}-{SCD2}	:	{Serial Control Direction}
	{SCKD}	:	{Clock Source Direction}
	{SHFD}	:	{Shift Direction}
	{FSL0}-{FSL1}	:	{Frame Sync Length}
	{SYN}	:	{Sync/Async}
	{GCK}	:	{Gated Clock Control}
	{MOD}	:	{SSI Mode Select}
	{TE}	:	{SSI Transmit Enable}
	{RE}	:	{SSI Receive Enable}
	{TIE}	:	{SSI Transmit Interrupt Enable}
	{RIE}	:	{SSI Receive Interrupt Enable}
{SSISR}	:	{SSI STATUS REGISTER}
	{IF0}-{IF1}	:	{Serial Input Flag}
	{TFS}	:	{Transmit Frame Sync Flag}
	{RFS}	:	{Receive Frame Sync Flag}
	{TUE}	:	{Transmitter Underrun Error Flag}
	{ROE}	:	{Receive Overrun Error Flag}
	{TDE}	:	{SSI Transmit Data Register Empty}
	{RDF}	:	{SSI Receive Data Register Full}
			{SSI Receive Shift Register}
{RX}	:	{SSI Receive Data Register}
			{SSI Transmit Shift Register}
{TX}	:	{SSI Transmit Data Register}
{TSR}	:	{SSI Time Slot Register}
